Grade 2 Concealed Vertical Rod Stile Exit Device in Duronotic for 36″ Doors

Product details

Duronotic finish For doors up to 36″ ANSI A156.3 Grade 2 Narrow stile Includes mortise cylinder and cylinder mounting pad with locking ring UL Listed – panic hardware Non-handed – reversible Dogging: outside unlatching and dogging by cylinder key or dogging by hex key in touch bar Top steel toggle latch and bottom steel rod latch bolt Mounting pad and locking ring Can be used for 30″ wide doors

Specifications

MPN | TH1100ST36CVRDU
Manufacturer | Global Door Controls
Brand | GLOBAL DOOR CONTROLS
Weight | 10.97