(5) Tier Shoe and Boot Rack- 33″W X 14″D X 63″H with Top Track and Hang Rail

(5) Tier Shoe and Boot Rack- 33"W x 14"D x 63"H with Top Track and Hang Rail (5) Tier Shoe and Boot Rack- 33"W x 14"D x 63"H with Top Track and Hang Rail. This sturdy 5 Tier Shoe and Boot Rack unit has epoxy coated steel wire shelving can be used in mudroom, laundry room, garage, quest room, basements and bedroom closets. Creates multi-purpose additional storage and holds up to 200 lbs. Each shoe rack is easy to install and provides more ways to store items than ever. All shoe racks lock on to the frame to keep them in place and will never fall off when your items are being removed or returned to their place. Each (5) Tier Shoe and Boot Rack accessory is easily removed and repositioned on the frame in seconds as requirements change.