Gladiator GarageWorks 6′ Wide 9-Outlet Workbench Powerstrip – 8′ L X 6″ H X 2″ Deep

Product details

Gladiator 9-Outlet Workbench Power Strip with Tool Caddy Extensions, 6′: Designed to coordinate perfectly with Gladiator brand 6′ and 8′ Workbenches 9-outlet power strip with tool caddy extensions 6′ has welded metal construction for strength and durability Extra long 10.75′ cord 7 outlets in the front and 2 in the back for easy access Ships with 2 tool caddies for storing items you want close at hand A 15-amp fused grounded electrical supply is required Caddies can be placed on the ends of the power strip or mounted to Gladiator wall systems

Specifications

MPN | GAAC68PSDW
Manufacturer | Gladiator
Brand | Gladiator GarageWorks
Age Group | adult
Color | white
Size | 8′ L x 6″ H x 2″ Deep
Length | 32.00 in
Width | 6.00 in
Height | 5.00 in
Weight | 22.00 lb