Gladiator 24-Piece 12-in X 12-in Blue Diamond Plate Garage Floor Tile

24-Piece 12-in x 12-in Blue Diamond Plate Garage Floor Tile Blue floor tiles easily snap together to allow custom designs of the homeowner's choosing Tiles are available for under-vehicle or wall-to-wall applications and can withstand extreme temperatures from 0Â°F to 120Â°F Easy to install tab and loop garage flooring system that snaps together Supports up to 250 lbs per square inch, 10-year limited warranty Tested to resist common chemicals Gladiator 24-Piece 12-in x 12-in Blue Diamond Plate Garage Floor Tile.